OPERA-2d

Pre and Post-Processor 8.013

22/May/2002 16:25:41 Page 4

UNITS

Length : cm Flux density: T Field strength: A m^{-1} Potential : Wb m^{-1} Conductivity: S m^{-1} Source density: A cm^{-2} Power : W Force : N Energy : J Mass : kg

PROBLEM DATA lc30515h.st Quadratic elements XY symmetry Vector potential Magnetic fields Static solution Scale factor = 1.0 21922 elements 44105 nodes 16 regions

0.0 5.0 10.0 15.0 20.0 25.0 30.0 35.0 40.0 45.0 50.0 55.0 60.0 65.0

-20.0

-15.0

-10.0

-5.0

0.0

5.0

10.0

15.0

20.0

X [cm]

Y [cm]

1 2 3 4 5

6

7

9 10 11 12 13

14

15