Page 4

Wed Sep 24 16:38:21 2003

Position

-400 -300 -200 -100 0 100 200 300 400

Time

2454

2455

2456

2457

2458

2459

2460

2461 4 x10 RF vs Time

Sensor

1 1.5 2 2.5 3 3.5 4 4.5 5

Time

2454

2455

2456

2457

2458

2459

2460

2461 4 x10 Accoustic (correlated) vs Time

Position

-400

-300-200

-100 0 100 200

300400

Time

2454

2455

2456

2457

2458

2459

2460

2461

4 x10

0 2 4 6 8 10 12

RF vs Time_{hRFvsTime}

Entries 116 Mean x 120.8 Mean y 2.458e+07 RMS x 154.6 RMS y 2.426e+04 0 0 0 0 112 4 0 0 0 Integral 112

RF vs Time

Sensor

1 1.5 2 2.5 3 3.5 4

4.5 5

Time

2454

2455

2456

2457

2458

2459

2460

2461

4 x10

0 1 2 3 4 5 6 7 8 9

Accoustic (correlated) vs Time_{hFAIvsTime}

Entries 33 Mean x 1.515 Mean y 2.457e+07 RMS x 1.048 RMS y 2.727e+04 0 0 0 0 33 0 0 0 0 Integral 33

Accoustic (correlated) vs Time