Wed Sep 24 16:38:20 2003

time (ns)

200 250 300 350 400 450 500 550 600 dn/dt (1/4ns)

0 2 4 6 8 10 12 14 16 18 20 22 Length of the incoming RF wave hwavelength

Entries 116 Mean 539.2 RMS 23.34 Underflow 2 Overflow 0 Integral 114

Length of the incoming RF wave

time (ns)

100 150 200 250 300 350 400 450 500 dn/dt (1/4ns)

0 5 10 15 20 25 30 35 40 45

Transit time (in to out) htransit

Entries 116 Mean 322.7 RMS 11.09 Underflow 0 Overflow 0 Integral 116

Transit time (in to out)

time (ns)

-100 0 100 200 300 400 500 600 700 dn/dt (1/4ns)

0

1

2

3

4

5 Breakdown time (after start of the wave) hbreakdownTime

Entries 116 Mean 279.4 RMS 127.1 Underflow 0 Overflow 0 Integral 116

Breakdown time (after start of the wave)

time (ns)

-400 -300 -200 -100 0 100 200 300 400 dn/dt (1/4ns)

0 1 2 3 4 5 6 7 Time difference (breakdown - reflexion) hdeltaT

Entries 116 Mean 120.8 RMS 154.6 Underflow 0 Overflow 4 Integral 112

Time difference (breakdown - reflexion)

Page 1