0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 1

Thu Sep 11 15:05:13 2003

time (ms)

Amplitude (A.U.)

0

50000 (up) t= 748 us

(up) t= 787.99 us (up) t= 1012 us

(up) t= 1124 us

2003-09-04-10-59-13

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.4

0.6

0.8

1

1.2

1.4

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 (rejected) Sensors 1-3 Sensors 1-4 Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 Sensor

Accoustic event Accoustic Data: 2003-09-04-10-59-13 Sensor order correct Sensor order: 1 2 3 4 Time (first - second) sensor: -.03 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 2

Thu Sep 11 15:05:14 2003

time (ms)

Amplitude (A.U.)

0 (up) t= 259.99 us (up) t= 1116 us (down) t= 268 us

(up) t= 995.99 us (up) t= 1032 us

(up) t= 1264 us

2003-09-04-11-00-42

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0

0.5

1

1.5

2

2.5

3

Position (m) time (ms)

0

1

2

3 Sound trajectory Sensors 1-2 (rejected) Sensors 1-3 Sensors 1-4 Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-00-42 Sensor order correct Signal speed is not homogeneous Sensor order: 1 2 3 4 Time (first - second) sensor: -.73 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 3

Thu Sep 11 15:05:14 2003

time (ms)

Amplitude (A.U.)

0 (up) t= 988 us

(up) t= 824 us (up) t= 1024 us

(up) t= 1320 us

(up) t= 1500 us (down) t= 1328 us 2003-09-04-11-01-49

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

0.4

0.6

0.8

1

1.2

1.4

Position (m) time (ms)

1

Sound trajectory

Sensors 1-2 Sensors 1-3 (rejected) Sensors 1-4 Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-01-49 Sensor order correct Signal speed is not homogeneous Sensor order: 2 1 3 4 Time (first - second) sensor: .16 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 4

Thu Sep 11 15:05:14 2003

time (ms)

Amplitude (A.U.)

0

(up) t= 1172. us

(up) t= 1036 us (up) t= 1020 us

(up) t= 1148 us

2003-09-04-11-02-45

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.7

0.8

0.9

1

1.1

1.2

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 Sensors 1-3 (rejected) Sensors 1-4 (rejected) Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-02-45 Sensor order correct Sensor order: 3 2 4 1 Time (first - second) sensor: .01 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 5

Thu Sep 11 15:05:15 2003

time (ms)

Amplitude (A.U.)

0 (up) t= 1452 us

(up) t= 1236 us (up) t= 1020 us

(up) t= 1208. us

2003-09-04-11-03-30

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.6

0.8

1

1.2

1.4

1.6

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 Sensors 1-3 Sensors 1-4 (rejected) Sensors 2-3 Sensors 2-4 (rejected) Sensors 3-4 Sensor

Accoustic event Accoustic Data: 2003-09-04-11-03-30 Sensor order correct Signal speed is not homogeneous Sensor order: 3 4 2 1 Time (first - second) sensor: -.18 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 6

Thu Sep 11 15:05:15 2003

time (ms)

Amplitude (A.U.)

0

(up) t= 1436 us

(up) t= 1204 us (up) t= 1056 us

(up) t= 1108 us

2003-09-04-11-04-52

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.6

0.8

1

1.2

1.4

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 Sensors 1-3 Sensors 1-4 (rejected) Sensors 2-3 Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-04-52 Sensor order correct Sensor order: 3 4 2 1 Time (first - second) sensor: -.05 ms

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 7

Thu Sep 11 15:05:15 2003

time (ms)

Amplitude (A.U.)

0

(up) t= 1539.99 us

(up) t= 1288 us

(up) t= 1224 us

(up) t= 1039.99 us

2003-09-04-11-05-54

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.6

0.8

1

1.2

1.4

1.6

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 Sensors 1-3 Sensors 1-4 Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 Sensor

Accoustic event Accoustic Data: 2003-09-04-11-05-54 Sensor order correct Signal speed is not homogeneous Sensor order: 4 3 2 1 Time (first - second) sensor: .18 ms

Wrong sensors order

0 0.5 1 1.5 2 0

10000

20000

30000

40000

50000

Page 8

Thu Sep 11 15:05:16 2003

Wrong sensors order

time (ms)

Amplitude (A.U.)

0 (up) t= 1116 us(up) t= 1764 us

(down) t= 1232 us

(up) t= 1236 us (up) t= 988 us

(up) t= 724. us

2003-09-04-11-07-50

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.6

0.8

1

1.2

1.4

1.6

Position (m) time (ms)

1

Sound trajectory Sensors 1-2 Sensors 1-3 (rejected) Sensors 1-4 Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-07-50 Wrong sensor order Signal speed is not homogeneous Sensor order: 4 3 1 2 Time (first - second) sensor: .26 ms

Wrong sensors order

0 0.5 1 1.5 2 0

10000

20000

30000

40000

Page 9

Thu Sep 11 15:05:16 2003

Wrong sensors order

time (ms)

Amplitude (A.U.)

0

(up) t= 540 us

(up) t= 868 us

(up) t= 1044 us (up) t= 1824 us

(down) t= 1052 us

(up) t= 1012 us

2003-09-04-11-09-39

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Position (m) time (ms)

1

Sound trajectory

Sensors 1-2 Sensors 1-3 Sensors 1-4 (rejected) Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-09-39 Wrong sensor order Signal speed is not homogeneous Sensor order: 1 2 4 3 Time (first - second) sensor: -.32 ms

Wrong sensors order

0 0.5 1 1.5 2 0

5000

10000

15000

20000

25000

Page 10

Thu Sep 11 15:05:16 2003

Wrong sensors order

time (ms)

Amplitude (A.U.)

0

(up) t= 732 us

(up) t= 928 us

(up) t= 688 us (up) t= 1652. us

(down) t= 700 us

(up) t= 8 us (up) t= 1664 us (down) t= 16 us 2003-09-04-11-11-47

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

-0.5

0

0.5

1

1.5

2

2.5

Position (m) time (ms)

0

1

2

Sound trajectory Sensors 1-2 Sensors 1-3 (rejected) Sensors 1-4 (rejected) Sensors 2-3 (rejected) Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-11-47 Wrong sensor order Signal speed is not homogeneous Sensor order: 4 3 1 2 Time (first - second) sensor: .68 ms

Wrong sensors order

0 0.5 1 1.5 2 0 5000

10000

15000

20000

25000

30000

Page 11

Thu Sep 11 15:05:17 2003

Wrong sensors order

time (ms)

Amplitude (A.U.)

0

(up) t= 931.99 us

(up) t= 1264 us (up) t= 960. us

(up) t= 88 us (up) t= 1824 us (down) t= 96 us 2003-09-04-11-12-57

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

-0.5 0 0.5 1 1.5 2 2.5 3

Position (m) time (ms)

0

1

2

3

Sound trajectory Sensors 1-2 Sensors 1-3 (rejected) Sensors 1-4 Sensors 2-3 Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-12-57 Wrong sensor order Signal speed is not homogeneous Sensor order: 4 1 3 2 Time (first - second) sensor: .84 ms

0 0.5 1 1.5 2 0

5000

10000

15000

20000

Page 12

Thu Sep 11 15:05:17 2003

time (ms)

Amplitude (A.U.)

0

(up) t= 1220 us (up) t= 1116 us

(up) t= 992 us

(up) t= 588 us (up) t= 1668 us

(down) t= 596 us

2003-09-04-11-14-31

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Position (m) time (ms)

1

2

Sound trajectory Sensors 1-2 Sensors 1-3 Sensors 1-4 (rejected) Sensors 2-3 Sensors 2-4 (rejected) Sensors 3-4 (rejected) Sensor

Accoustic event Accoustic Data: 2003-09-04-11-14-31 Sensor order correct Signal speed is not homogeneous Sensor order: 4 3 2 1 Time (first - second) sensor: .40 ms