CDC Meeting Report_{K.Hoshina 2001.4.26}

1 Progress Report and Problems

1.a Geant4.3.1 is working on MacOSX See Web page:

http://www-jlc.kek.jp/ hoshina/cdc/geant4/

1.b Bug Report of Geant4.3.1

• Phi boundary problem of G4Tubs is fixed. • r boundary problem of G4Tub is still remaining. • DecayTable of particles are deleted after grandchild particles.

⇒ I’ve reported the problem Geant4-Users-Group and Krashige-san(a member of deveropers) is fixing the problem now.

1.c Problem

• Problem of Endless Roop:

1.d ToDo List

• Fix the problem of endless roop • Make examples for other sub-group (almost finished) • Remake analysis program •