HPK CCD

Feature

• Full frame transfer type • 2 phase CCD • MPP operation to reduce dark current Developed for Scientific Researches • Low light level measurements

(e.g. spectroscopy) • X-ray astronomy ⇒ How about MIP detection?

especially at higher temperature Application for high energy physics