0 200 400 600 800 1000 0 20 40 60 80 100 120 140 hPShape Nent = 210902 Mean = 446.6 RMS = 162.1

Pulse Shape_{hPShape}

beam4mm_ND0% ND60% ND50% ND20% beam distance4mm_pulseshape

TDC

ADC