0cm20cm

40cm

60cm

80cm100cm

Plastic Scintillator Tiles

WLS Fiber

Clear Fiber

10.8%

0.07%

0.8%

0.3%

0.1%

1.2%

0.03%

0.2%

0.0%

0.5%