c) Photon Detectors sm11¥ EMC/HCALmulti-channel HPD/HAPD : promising (however cost-down needed) ¥ Scintillator-Strip EMC/SHmax needsuper-multichannel photo-detector.¥ 61ch-HPD ; tests in progress¥ EBCCD ; tests in progress. Higher gain needed.

CCD Optical Fibers from SHmaxPhoto-electronsPixels Signal DistributionPhoto-cathodePrinciple of EBCCD

Gain vs photo-cathode voltage for proximity-focused EBCCD