[B] Granularity O p t i m i z a t i o n sm09Optimization with a full simulator based on GEANT3¥ Tuning ofcalorimeter response in progress¥ Hadron-clustering algorithm under development¥ Cluster-track association algorithm under development¥ Implementation of

PH deviation 4 GeV e -

- 40

- 20

0

20

40

- 50 0 50

d^3 d^1

- 50 0 50

d^4 d^3

- 40

- 20

0

20

40

- 50 0 50

d_~^3 d_~^4

- 50 0 50

d_~^3 d_~^1

PH deviation 4 GeV p_-

- 40 - 20 0 20 40

- 50 0 50

d^3 d^1

- 50 0 50

d^4 d^3

- 40 - 20 0 20 40

- 50 0 50

d_~^3 d_~^4

- 50 0 50

d_~^3 d_~^1

hadron shower generatorwith realistic fluctuationStill working hard tomake ’Un-Correlated’distribution function.Yet a lot to do before reconstruction of physics processes for optimization.Un-correlated fluctuation for EM

Correlated fluctuation for hadrons