b) L i n e a r i t y sm07

Good Linearity thanks to Hardware Compensation.(better than 1% from 2 GeV to 150 GeV )c) Tower Boundary Response

¥ No significant anomaly was observed at the tower boundary for pions.¥ Slight anomaly was observed for electrons. EM module must be designed with more uniform response.