Figure 5.22: Energy resolution vs. Pb thickness for π’s Solid and dashed curves shown in the figure are fitting results to Eq. (5.2) except for 1 GeV and 1 GeV. Dotted line in the figure is the requirement of the energy resolution for the JLC hadron calorimeter.