sm01Snowmass 2001July 16, 2001Calorimeter for JLC ExperimentHiroyuki MatsunagaUniversity of TsukubaCONTENTS

1) Required Performance 4) Other R&Ds2) Basic Parameters a) Scintillator-strip EMCAL3) Proof ofPerformance b) Direct-readout Scintillator-strip SHmax[A] Beam Tests c) Photon Detectorsa) Energy Resolution d) Lead Alloyb) Linearity 5) Summaryc) Tower Boundaryd) e/pSeparation[B] SimulationJLC-CAL group is a collaboration of KEK,Kobe, Konan, Niigata, Shinshu, and Tsukuba