0

250

500

750

1000

1250

1500

1750

2000

2250

2500

4 5 6 7 8 9 10 20 30

-100^oC -81^oC -64^oC -44^oC -26^oC -17^oC

Vertical shift pulse width (μs)

Dark current pedestal (electrons)