(GeV)

60708090100110120130140150160020406080100120140160hHmassNent = 1388

Mean = 104.767

RMS = 8.18112

Chi2 / ndf = 7.97675 / 8

Constant = 149.191 +- 5.10156

Mean = 107.774 +- 0.0355505

Sigma = 2.74187 +- 0.0384765 hHmass

Nent = 1388

Higgs mass

file: jsf/example/ZHStudy

e+e-hmh= 110 GeV

Ecm= 300GeV

Pythia+QucikSim νν