0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 2 4 6 8 10 12 14 16 18

TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 1 2 3 4 5 6 7 8 TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TOF v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 3.5 4 TOF v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

ADC_TOF1 v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 1 2 3 4 5 6 TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

5

10

15

20

25

TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

CH1 v.s. CH2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

CH1 v.s. PbG

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 CH1 v.s. PbG