0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 100 200 300 400 500 600 700 800 TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

20

40

60

80

100

120 TOF v.s. ADC_TOF1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TOF v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180 TOF v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

ADC_TOF1 v.s. ADC_TOF2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160

TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180

TC1 v.s. TC2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

CH1 v.s. CH2

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

CH1 v.s. PbG

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

50

100

150

200

250

CH1 v.s. PbG