0 50 100 150 200 250 300

6.5 7 7.5 8 8.5 9 9.5 10 10.5 11 11.5 Negative drive pulse voltage of the vertical register V_{ee}^V (V)

Dark current pedestal (electrons)

8 μs 16 μs

Pulse width (a)

0 25 50 75 100 125 150 175 200

2.5 3 3.5 4 4.5 5 5.5 6 6.5 7 7.5

8 μs 16 μs

Pulse width (b)

Positive drive pulse voltage V_{cc} (V)

Dark current pedestal (electrons)