5 6 7 8 9 10

20 30 40 50 60 70 80 90 100

200

3 4 5 6 7 8 9 10 Negative drive pulse voltage of the vertical register V_{ee}^V(V)

Dark current (electrons/s/pix)

8.9x10^9 neutrons/cm^2 3.2x10^9 neutrons/cm^2 2.4x10^8 neutrons/cm^2 1.1x10^8 neutrons/cm^2 before irradiation