0

10

20

30

40

50

60

-100 -80 -60 -40 -20 0 20 Temperature (^oC)

CTI (x10^{-5})

8.9x10^9 neutrons/cm^2 3.2x10^9 neutrons/cm^2 before irradiation

VCTI HCTI