0

10

20

30

40

50

60

70

80

-120 -100 -80 -60 -40 -20 0 20 40 Temperature (^oC)

VCTI (x10^{-5})

Fat zero 0 e^- 10 e^- 100 e^-

Phase 1 Phase 2