02004006008001000

s

(fb)�s (GeV)ZZ|cosq|<0.8|cosq|<0.8W+W—tt 175GeVZh120GeVm+m—m+Rm—R140GeVm+Lm—L230GeV~~c+c—220GeV~~HA400GeVH+H—410GeV~~H+H—190GeV

110610— 2 103Sqqq=t