-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2

0 1 2 3 4 5

.000E+00 .000E+00 .000E+00 .000E+00 .354E+04 .000E+00 .000E+00 .000E+00 .000E+00

s2:x-dx cor

ID=208,N=3535 PROY s2:x-dx cor 0 50 100 150 200 250 300 350

-0.2 -0.1 0 0.1 0.2

Mean RMS .6775E-03 .1178E-01 223.0 / 47 Constant 278.8 Mean .7617E-03 Sigma .9477E-02

ID=216,N=3535

SGX CHBN s2:x-dx cor 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0 1 2 3 4 5

Mean RMS 3.064 1.473

ID=219,N=10