0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0

50

100

150

200

250

300 Nent = 0 Mean = 0 RMS = 0

Diffusion

Diffusion coefficient

) cm m / μ(

Electric field (kV/cm)

NDfilter 5%

NDfilter 50%