0 0.5 1 1.5 2 2.5 3 3.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Nent = 0 Mean = 0 RMS = 0

___0 Nent = 0 Mean = 0 RMS = 0 Chi2 / ndf = 8.58 / 4 369.4 ± p0 = 3728 271.6 ± p1 = 4165

Diffusion

± ±

Drift length (cm)

2 xσ )^2mμ(

NDfilter 50% E = 0.2 (kV/cm)