drift time (ns)

4060 4080 4100 4120 4140 4160 4180 4200 number of events

0 20 40 60 80 100 120 140 160 PhPk_px Nent = 2824 Mean = 4136 RMS = 5.112

PhPk_{PhPk_px}

NDfilter 50% E = 0.2 (kV/cm) Laser positon = 7