drift time (ns)

4000 4050 4100 4150 4200 4250 4300 4350 4400 number of events

0

10

20

30

40

50

PhPk_px Nent = 779 Mean = 4167 RMS = 18.67

PhPk_{PhPk_px}

E = 0.2 (kV/cm)

NDfilter 5%

Laser position = 7