drift time (ns)

5500 5550 5600 5650 5700 5750 5800 5850 5900 number of events

0 5 10 15 20 25 30 35 PhPk_px Nent = 800 Mean = 5716 RMS = 27.24

PhPk_{PhPk_px}

E = 0.2 (kV/cm)

NDfilter 5%

Laser position =2