drift_time (ns)

4000 4500 5000 5500 6000

20 40 60 80 100 120 140

PhPk Nent = 6001 Mean x = 4903 Mean y = 65.8 RMS x = 524 RMS y = 15.19

PhPk_{PhPk}

3500 4000 4500 5000 5500 6000 0 500 1000

1500

2000

2500

3000

3500

4000

PhSum Nent = 6001 Mean x = 4903 Mean y = 1758 RMS x = 524 RMS y = 247.8

PhSum_{PhSum}

3500 4000 4500 5000 5500 6000 0 20 40 60 80 100 120 140 160 PhPk_px Nent = 2824 Mean = 4903 RMS = 524

PhPk_{PhPk_px}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 20 40 60 80 100 120 140 160 180 200 220 PhSum_py Nent = 2886 Mean = 1758 RMS = 248 Chi2 / ndf = 92.79 / 85 3.119 ± Constant = 195 3.193 ± Mean = 1759 2.27 ± Sigma = 242

PhSum PhSum_py

± ± ±