FADC time slots

0 100 200 300 400 500

Pulse height (ADC value)

0 10 20 30 40 50 60 70

hPShape Nent = 1095750 Mean = 165.8 RMS = 61.67

Pulse Shape_{hPShape}

θ = 30 Normalized by cos θ = 0 θ