0 2000 4000 6000 8000 10000 0 20 40 60 80 100 120 140 160 180

Ph02_py Nent = 1698 Mean = 2696 RMS = 1314

Ph02

FWHM=1595

Peak=2105

Cell 1 wire#3_+ π 1.0 GeV = 0 deg. θ