trunc.

(dE/dx)

0 1000 2000 3000 4000 5000 6000 7000 count

0

5

10

15

20 25 π_{/(dE/dx) = 5.2 %} σ proton /(dE/dx) = 5.2 % σ Separation

= 4.6 )/2_πσ+_pσ( π -(dE/dx) p (dE/dx)