-0.4

-0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4

-0.5 -0.25 0 0.25 0.5

X (mm) 0 500 1000 1500 2000 x 102

Intensity (arbitrary unit)

Y (mm)

Y-Projection

(a) Field Wire