-0.3 -0.2 -0.1 0 0.1 0.2 0

20

40

60

80

100

120 hHodXdiflo_py Nent = 1000 Mean = -0.0951 RMS = 0.09796

hHodXdif_{hHodXdiflo_py}

During spill

Between spill

Run#2875 +0.4GeV

Mean = -0.1146 0.003311 ±

Mean = -0.1209 0.002033 ±