-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0

5

10

15

20

25

30 hHodXdifhi_py Nent = 275 Mean = -0.08867 RMS = 0.1036

hHodXdif_{hHodXdifhi_py}

During spill

Between spill Run#2864

+1.0GeV SenseH.V.=2.8kV

Mean = -0.1027 0.003176cm

Mean = -0.1496 + ± 0.002482 ±