0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 TC2Sep02 Nent = 460 Mean x = 525.2 Mean y = 0.967 RMS x = 145 RMS y = 0.7886

= 30) θ Run0876 (

TC2Sep02_{TC2Sep02}

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 5 10 15 20 25 30 35 40 45 50 TC2Sep02_lo_py Nent = 100 Mean = 1.04 RMS = 0.9338 Lo

TC2Sep02

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 5 10 15 20 25 30 35 40 45 50 TC2Sep02_hi_py Nent = 207 Mean = 0.921 RMS = 0.6859 Hi

TC2 size (3cm)

TC2Sep02

0 200 400 600 800 1000 0 5 10 15 20 25 30 35 40 45 50 TC2Sep02_px Nent = 307 Mean = 517.5 RMS = 129.7

2-track 1-track

Hi Lo

TC2’s ADC

TC2Sep02 TC2Sep02_px