0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 TC2Sep02 Nent = 137 Mean x = 563.1 Mean y = 1.074 RMS x = 145.6 RMS y = 0.9536

TC2Sep02_{TC2Sep02}

Nent = 534 Mean x = 527.2 Mean y = 1.163 RMS x = 116.8 RMS y = 0.8486

Run0848

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

1

2

3

4

5 TC2Sep02_lo_py Nent = 30 Mean = 1.141 RMS = 1.006

TC2Sep02 hTC2Sep02_lo_py Nent = 111 Mean = 1.307 RMS = 0.974

Lo

Lo

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 2 4 6 8 10 12 14 TC2Sep02_hi_py Nent = 91 Mean = 1.051 RMS = 0.933

TC2Sep02 hTC2Sep02_hi_py Nent = 255 Mean = 1.108 RMS = 0.7886

Hi

TC2 size (3cm) Hi

0 200 400 600 800 1000 0

2

4

6

8

10 TC2Sep02_px Nent = 121 Mean = 557.1 RMS = 130.5

TC2Sep02 TC2Sep02_px

Nent = 366 Mean = 524.2 RMS = 110.6

2-track

1-track

Hi Lo

TC2’s ADC