0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 TC2Sep02 Nent = 406 Mean x = 500.6 Mean y = 1.246 RMS x = 126.6 RMS y = 0.9389

TC2Sep02_{TC2Sep02}

Nent = 534 Mean x = 527.2 Mean y = 1.163 RMS x = 116.8 RMS y = 0.8486

Run0841

0 1 2 3 4 5 0

5

10

15

20

25 hTC2Sep02_lo_py Nent = 118 Mean = 1.358 RMS = 1.02

TC2Sep02

Nent = 111 Mean = 1.307 RMS = 0.974 Lo

0 1 2 3 4 5 0

5

10

15

20

25

30 hTC2Sep02_hi_py Nent = 176 Mean = 1.148 RMS = 0.8503

TC2Sep02

Nent = 255 Mean = 1.108 RMS = 0.7886

Hi

TC2 size (3cm)

Hi

0 200 400 600 800 1000 0 5 10 15 20 25 30 35 40 45 TC2Sep02_px Nent = 294 Mean = 498.9 RMS = 123.6

TC2Sep02 TC2Sep02_px

Nent = 366 Mean = 524.2 RMS = 110.6 2-track 1-track

Lo

TC2’s ADC

Hi