0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 TC2Sep02 Nent = 515 Mean x = 409.7 Mean y = 1.122 RMS x = 127.9 RMS y = 0.7888

TC2Sep02_{TC2Sep02}

Nent = 534 Mean x = 527.2 Mean y = 1.163 RMS x = 116.8 RMS y = 0.8486

Run0837

m-thick Pb μ Target: 500 Drift-length: 1cm

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

5

10

15

20

25

TC2Sep02_lo_py Nent = 208 Mean = 1.208 RMS = 0.8386

TC2Sep02 hTC2Sep02_lo_py Nent = 111 Mean = 1.307 RMS = 0.974 Lo

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 2 4 6 8 10 12 14 16 18 TC2Sep02_hi_py Nent = 119 Mean = 0.8914 RMS = 0.5828

TC2Sep02 hTC2Sep02_hi_py Nent = 255 Mean = 1.108 RMS = 0.7886 Hi

TC2 size (3cm)

0 200 400 600 800 1000 0 10 20 30 40 50 60 TC2Sep02_px Nent = 327 Mean = 410.3 RMS = 127.4

TC2Sep02 TC2Sep02_px

Nent = 366 Mean = 524.2 RMS = 110.6

2-track

1-track

Hi Lo

TC2’s ADC