0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

0.2

0.4

0.6

0.8

1 Eff2trk02_e Nent = 0 Mean = 1.785 RMS = 0.949

Eff2trk02 Eff2trk02_e

Run0837

m-thick Pb μ Target: 500 Drift-length: 1cm