0 2000 4000 6000 8000 10000 0 20 40 60 80 100 120 140 160 180 200 Ph02_chbn_py Nent = 178 Mean = 2405 RMS = 1539

Ph02 +π

proton

2GeV senseH.V. 2.5kV 7dB wire#3