0 2000 4000 6000 8000 10000 0 50 100 150 200 250 300 350 Sumw500_chbn_py Nent = 87 Mean = 2597 RMS = 874.9

Sumw500_{Sumw500_chbn_py}

2.0GeV +π +e

proton

charge

7dB wire#1~5 average